-80-40040800.00.20.40.60.81.01.2

-80-40040800.00.20.40.60.81.01.2y (mm)

-80-40040800.00.20.40.60.81.01.2x (mm)KL BEAMHORIZONTALVERTICALHORIZONTALVERTICALCentre: -8 mm w.r.t. KLFISC-9FISC-9