-2.0-1.00.01.02.001.10-72.10-73.10-74.10-75.10-7x (mm)

373839404104.10-68.10-61.10-5y (mm)FISC-7FISC-8HORIZONTALVERTICALRMS = 0.20 mmRMS = 0.19 mm