-50-46-42-38-34-30-26-22-18-14-100.0.1001.0.10-52.0.10-53.0.10-54.0.10-5Trim-5 Current (Amps) 0.5 mradat KL targetSCAN TAGGING MONITOR COUNTERS vs TRIM-5 OF P42